--#SET TERMINATOR @

SET SERVEROUTPUT ON@

BEGIN
 DECLARE I SMALLINT DEFAULT 1;
 WHILE (I = I) DO
  CALL DBMS_OUTPUT.PUT_LINE('SPAM');
 END WHILE;
END @
